Joint DESY and University of Hamburg Accelerator Physics Seminar

Tuesday, 20.01.2015

(16:00 in Room 459/30b)

Results of Performance Test and Error Estimation in AMTF

Kirk Yasuchika Yamamoto, KEK

Abstract Performance tests for cavities and modules are ongoing in AMTF for XFEL. In this seminar, the recent results are presented including the error estimation. Moreover, some topics, Q_{ext} shifting in V.T., performance degradation in module test, and so on, are discussed.

J.Roßbach (Univ. HH) and M.Vogt (MFL).

Visit our web site at http://www-mpy.desy.de/AccPhySemDESY/index.html