Joint DESY and University of Hamburg Accelerator Physics Seminar

Tuesday, 18.12.2012

(16:00 in Room 459/30b)

The KU–FEL Facility

Konstantin Torgasin

Institute of Advanced Engery (Kyoto University)

Abstract The Kyoto University FEL (KU–FEL) is a mid–infrared FEL facility which has been constructed to develop materials needed for energy devices, e.g. for purposes of photo– Voltaic application. The structure of the facility will be introduced. Moreover, an upgrade project on the thermionic gun will be presented.

J.Roßbach (Univ. HH) and M.Vogt (MFL).

Visit our web site at http://www-mpy.desy.de/AccPhySemDESY/index.html