Joint DESY and University of Hamburg Accelerator Physics Seminar

Tuesday, 13.12.2011

(16:00 in Room 459/30b)

Status of Optics Modeling at the Metrology Light Source and at BESSY II

Peter Schmid HZB

Abstract The results of studies employing LOCO and MML for optics calibration at the Metrology Light Source and at the BESSY II storage rings are presented. Both the standard user modes and dedicated low alpha modes were investigated.

J.Roßbach (Univ. HH) and M.Vogt (MFL).

Visit our web site at http://www-mpy.desy.de/AccPhySemDESY/index.html