Joint DESY and University of Hamburg Accelerator Physics Seminar

Tuesday, June 15-th, 2010

(16:00 in Room 459/30b)

Plans for LCLS–II

Heinz–Dieter Nuhn

(SLAC / LCLS)

Abstract Even before the LCLS construction project was officially completed, an upgrade project, called LCLS–II was officially started. The main purpose is to increase the beam availability and beam quality, by providing several beamlines, a wider spectral range as well as high spectral brightness, polarization control and pump–probe options. The talk will present an overview of the current planning status at the start of the 7–year project.

J.Roßbach (Univ. HH) and M.Vogt (MPY).

Visit our web site at http://www-mpy.desy.de/AccPhySemDESY/index.html