Accelerator Physics Seminar

Tuesday August 05, 2003

(16:00 in Room 459/30b)

PETRA III — A new high brilliant x-ray light source

Klaus Balewski

DESY / MPE

Abstract In this talk the plans for converting PETRA II into a dedicated light source will be presented. The key parameters of the new machine and some technicals details of the rebuilding will be explained. The technical and physical challenges of the project will be outlined.

D.P.Barber (MPY) and M.Vogt (MPY).

Visit our web site at http://www-mpy.desy.de/AccPhySemDESY/